i1 (diode equation) i2 (KCL equation)

1 1.5 2 2.5

-0.01

-0.008

-0.006

-0.004

-0.002 0 0.002

0.004

0.006

0.008

0.01

Voltage (V)

Current (A)

Current as a function of Voltage for Series Resistor-Diode Circuit